From b3f8090f4e42a73434da3f6d7854762f855ee679 Mon Sep 17 00:00:00 2001
From: Jens Rottmann <JRottmann@LiPPERTEmbedded.de>
Date: Fri, 27 Aug 2010 09:36:41 +0000
Subject: drop three unneeded config variables: - HAVE_HIGH_TABLES -
 HAVE_LOW_TABLES - FALLBACK_SIZE

Jens Rottmann sent an almost identical patch at the same time, so
Signed-off-by: Jens Rottmann <JRottmann@LiPPERTEmbedded.de>

Signed-off-by: Stefan Reinauer <stepan@coresystems.de>
Acked-by: Stefan Reinauer <stepan@coresystems.de>



git-svn-id: svn://svn.coreboot.org/coreboot/trunk@5745 2b7e53f0-3cfb-0310-b3e9-8179ed1497e1
---
 documentation/Kconfig.tex | 4 ----
 1 file changed, 4 deletions(-)

(limited to 'documentation/Kconfig.tex')

diff --git a/documentation/Kconfig.tex b/documentation/Kconfig.tex
index 7254c5a5d2..e8e3f414e7 100644
--- a/documentation/Kconfig.tex
+++ b/documentation/Kconfig.tex
@@ -420,10 +420,6 @@ config NORTHBRIDGE_AMD_AMDK8
 config AGP_APERTURE_SIZE
   hex
   default 0x4000000
-
-config HAVE_HIGH_TABLES
-  int
-  default 1
 \end{verbatim}
 \subsubsection{northbridge/$<$vendor$>$/$<$chip$>$/Makefile.inc}
 Typically very small set of rules, and very simple.
-- 
cgit v1.2.3

